import type { PillProps } from "$/types/PillTypes";
import clsx from "clsx";
import Pill from "./Pill";


export default function MoltenPill({
	className,
	...props
}: Readonly<PillProps>){
	return (
		<Pill
			data-testid="mattrixwv-molten-pill"
			className={clsx(
				className,
				"bg-molten text-black"
			)}
			{...props}
		/>
	);
}
